Entries 170155 Mean 0.3006 RMS 0.2472 / ndf

2χ 656.5 / 81 Constant 0.006 ± 9.143 Slope 0.013 ± -3.587

-t 0 0.2 0.4 0.6 0.8 1 1.2

210

310

410 ± ± t-dependence