0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0 50 100 150

f5ππ

f5η^,η^, f5ηη^, f5ηη f5KK

(a)

Θ ΜDegreesΝ γ^2 Μ(g_T)^2Ν