500 1000 1500 0

0.5

1 = 0.78 - 0.8 GeV γE

0 500 0

0.5

1 data data with background n(p) + η +π NN η ’NN sim. η n(p) sim. η sim. π NN η ’NN sim. η

500 1000 1500 0

0.5

1 = 0.9 - 1.0 GeV γE 2×

0 500 0

0.5

1

500 1000 1500 0

0.5

1 = 1.4 - 1.6 GeV γE 4×

0 500 0

0.5

1

500 1000 1500 0

0.5

1 = 2.0 - 2.5 GeV γE 5×

0 500 0

0.5

-200 0 200 400 600 800

400 600 800 1000 1200 1400 ) [MeV]

0π^0π^0πm( m [MeV] Δ

Counts [a.u.]