[MeV] γE 500 1000 1500 2000 2500

]^{-1})^4 (MeV.s. 10

× _γ [N ϕ

0

1

2

3

= 2.6 GeV -eE = 3.2 GeV -eE

[MeV] γE 1000 1500 2000

= 2.6 GeV)

-e(E σ = 3.2 GeV) /

-e(E σ

0.8

0.9

1

1.1