-1-0.5 0 0.5 1

5 10 fac∈ ph∈ pnη→dγ -1-0.5 0 0.5 1 2 4 6 = 714 MeV γE

p(n) η→dγ -1-0.50 0.5 1

0.5 1

n(p) η→dγ

-1-0.5 0 0.5 1 2 4 6

-1-0.5 0 0.5 1 1 2 3 4 = 812 MeV γE

-1-0.50 0.5 1 0.2 0.4 0.6 0.8

-1-0.5 0 0.5 1 2 4 6

-1-0.5 0 0.5 1 2 4 6 = 1025 MeV γE

-1-0.50 0.5 1

0.5

1

-1-0.5 0 0.5 1 2 4 6

-1-0.5 0 0.5 1 2 4 6 8 = 1474 MeV γE

-1-0.50 0.5 1 0.5 1 1.5

-1-0.5 0 0.5 1 2 4

-1-0.5 0 0.5 1 2 4 6 = 2024 MeV γE

-1-0.50 0.5 1 0.5 1 1.5 2

-1-0.5 0 0.5 1 -1-0.5 0 0.5 1 -1-0.5 0 0.5 )^*_ηΘ cos(

[%] ∈