0 10 20 30 40 50 60

-5 -4 -3 -2 -1 0 1 2 3 4 5

δσ_i/Δσ_i counts

fitted Gauss σ = 1.25 μ = 0.034 standard Gauss σ = 1.0 μ = 0.0