1

10

500 1000 1500 2000 2500

σΜμbΝ

E_γΜMeVΝ

σ(ηp), free proton σ(ηp), quasi-free, unfolded

0

5

10

15

600 800 1000 1200 1400

0.5

1.0

1.5 σ(ηp), quasi-free

σΜμbΝ

E_γΜMeVΝ