proton_lambda_pull

Entries 233421 Mean -0.04476 RMS 0.9793

-5 -4 -3 -2 -1 0 1 2 3 4 5 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

Proton Lambda Pull