sit04_proton_lambda_pull

Entries 245568 Mean -0.03993 RMS 0.9555

-5 -4 -3 -2 -1 0 1 2 3 4 5 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

Proton Lambda Pull Sit04