+ πϕ 0 1 2 3 4 5 6

I

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 W = 1.65 [GeV]

+ πϕ 0 1 2 3 4 5 6

I

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 W = 1.70 [GeV]

+ πϕ 0 1 2 3 4 5 6

I

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 W = 1.75 [GeV]

+ πϕ 0 1 2 3 4 5 6

I

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 W = 1.80 [GeV]

+ πϕ 0 1 2 3 4 5 6

I

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 W = 1.90 [GeV]

0 1 2 3 4 5 6 0

0.2

0.4

0.6

0.8

1 Topology - 01

Per-32 Per-45 Per-67 Per-Ave g1c-data

-0.2

0

0.2

-0.2

0

0.2

-0.2

0

0.2

0 2 4 6

0 2 4 6 +πϕ

Polarization Observable I